<script setup>
  useHead({
    title: '404 - Page not found',
    meta: [
      { 
        name: 'description', 
        content: `This page does not exist or has been moved.` 
      },      
    ],
  })  
</script>

<template>
  <Header></Header>
  <main>
    <div class="lost">
      <h3>404</h3>
      <h4>Page not found</h4>
      <NuxtLink to="/">Go back</NuxtLink>
    </div>
  </main>
  <Footer></Footer>
</template>
