<script setup>
  useHead({
    title: '404 - Page not found',
    meta: [
      { 
        name: 'description', 
        content: `This page does not exist or has been moved.` 
      },      
    ],
  })
</script>

<template>
  <Header></Header>
  <main>
    <div class="lost">
      <img alt="404" src="/img/bucket.svg" />
      <h2>Page not found</h2>
      <NuxtLink to="/"><p>Go back</p></NuxtLink>
    </div>
  </main>
  <Footer></Footer>
</template>